<template>
  <div class="app-container">
    <el-form
      :model="queryParams"
      ref="queryForm"
      size="small"
      :inline="true"
      v-show="showSearch"
      label-width="68px"
    >
      <el-form-item
        label="护理站"
        prop="nurseStationId"
      >
        <el-select
          v-model="queryParams.nurseStationId"
          placeholder="请选择护理站"
          @keyup.enter.native="handleQuery"
        >
          <el-option
            v-for="item in handstationlist"
            :key="item.id"
            :label="item.nurseStationName"
            :value="item.id"
          >
          </el-option>
        </el-select>
      </el-form-item>
     
      <el-form-item label="科室编码" prop="departmentCode">
        <el-input
          v-model="queryParams.departmentCode"
          placeholder="请输入科室编码"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>
      <el-form-item label="科室名称" prop="departmentName">
        <el-input
          v-model="queryParams.departmentName"
          placeholder="请输入科室名称"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>
      <el-form-item>
        <el-button
          type="primary"
          icon="el-icon-search"
          size="mini"
          @click="handleQuery"
          >搜索</el-button
        >
        <el-button icon="el-icon-refresh" size="mini" @click="resetQuery"
          >重置</el-button
        >
      </el-form-item>
    </el-form>

    <el-row :gutter="10" class="mb8">
      <el-col :span="1.5">
        <el-button
          type="primary"
          plain
          icon="el-icon-plus"
          size="mini"
          @click="handleAdd"
          v-hasPermi="['system:StationDepartment:add']"
          >新增</el-button
        >
      </el-col>
      <el-col :span="1.5">
        <el-button
          type="success"
          plain
          icon="el-icon-edit"
          size="mini"
          :disabled="single"
          @click="handleUpdate"
          v-hasPermi="['system:StationDepartment:edit']"
          >修改</el-button
        >
      </el-col>
      <el-col :span="1.5">
        <el-button
          type="danger"
          plain
          icon="el-icon-delete"
          size="mini"
          :disabled="multiple"
          @click="handleDelete"
          v-hasPermi="['system:StationDepartment:remove']"
          >删除</el-button
        >
      </el-col>
      <right-toolbar
        :showSearch.sync="showSearch"
        @queryTable="getList"
      ></right-toolbar>
    </el-row>

    <el-table
      v-loading="loading"
      :data="StationDepartmentList"
      @selection-change="handleSelectionChange"
    >
      <el-table-column type="selection" width="55" align="center" />
      <el-table-column
        label="护理站名称"
        align="center"
        prop="nurseStationName"
      />
      <el-table-column label="科室编码" align="center" prop="departmentCode" />
      <el-table-column label="科室名称" align="center" prop="departmentName" />
      <el-table-column label="联系电话" align="center" prop="phone" />
      <el-table-column label="创建时间" align="center" prop="createTime" />
      <el-table-column label="创建人" align="center" prop="createBy" />
      <el-table-column
        label="操作"
        align="center"
        class-name="small-padding fixed-width"
      >
        <template slot-scope="scope">
          <el-button
            size="mini"
            type="text"
            icon="el-icon-edit"
            @click="handleUpdate(scope.row)"
            v-hasPermi="['system:StationDepartment:edit']"
            >修改</el-button
          >
          <el-button
            size="mini"
            type="text"
            icon="el-icon-delete"
            @click="handleDelete(scope.row)"
            v-hasPermi="['system:StationDepartment:remove']"
            >删除</el-button
          >
        </template>
      </el-table-column>
    </el-table>

    <pagination
      v-show="total > 0"
      :total="total"
      :page.sync="queryParams.pageNum"
      :limit.sync="queryParams.pageSize"
      @pagination="getList"
    />

    <!-- 添加护理站部门信息对话框 -->
    <el-dialog
      :title="title"
      :visible.sync="addopen"
      width="800px"
      append-to-body
    >
      <el-form
        ref="form"
        :model="form"
        :rules="rules"
        label-width="100px"
        :inline="true"
      >
        <div
          v-for="(item, index) in form.nurseStationDepartmentList"
          :key="index"
          style="margin-top: 20px; border-bottom: 1px solid #f3f3f3"
        >
          <el-form-item
            label="所属护理站"
            :rules="rules.nurseStationDepartmentList.nurseStationId"
            :prop="`nurseStationDepartmentList.${index}.nurseStationId`"
          >
            <el-button
              type=""
              v-if="item.nurseStationName == '请选择所属护理站'"
              @click="clickinnerVisible(item, index)"
              style="
                width: 250px;
                text-align: left;
                height: 36px;
                color: #c0c4cc;
                overflow: hidden;
              "
              >{{ item.nurseStationName }}</el-button
            >
            <!-- @click="clickinnerVisible(item, index)" -->
            <el-button
              @click="clickinnerVisible(item, index)"
              type=""
              v-else
              style="
                width: 250px;
                text-align: left;
                height: 36px;
                padding-left: -10px;
                overflow: hidden;
              "
              >{{ item.nurseStationName }}</el-button
            >
          </el-form-item>
          <el-form-item
            label="科室名称"
            :rules="rules.nurseStationDepartmentList.departmentName"
            :prop="`nurseStationDepartmentList.${index}.departmentName`"
          >
            <el-input
              v-model="item.departmentName"
              placeholder="请输入科室名称"
              style="width: 250px"
              maxlength="15"
            />
          </el-form-item>
          <el-form-item
            label="科室负责人"
            :rules="rules.nurseStationDepartmentList.departmentPerson"
            :prop="`nurseStationDepartmentList.${index}.departmentPerson`"
          >
            <el-input
              v-model="item.departmentPerson"
              placeholder="请输入科室负责人"
              style="width: 250px"
              maxlength="15"
            />
          </el-form-item>
          <el-form-item
            label="联系电话"
            :rules="rules.nurseStationDepartmentList.phone"
            :prop="`nurseStationDepartmentList.${index}.phone`"
          >
            <el-input
              v-model="item.phone"
              placeholder="请输入联系电话"
              maxlength="11"
              style="width: 250px"
            />
          </el-form-item>
          <el-button
            type="primary"
            circle
            plain
            icon="el-icon-circle-plus-outline"
            @click="adddisease"
            v-if="index == 0"
          ></el-button>
          <el-button
            type="danger"
            icon="el-icon-delete"
            circle
            plain
            @click="deldisease(index)"
            v-if="index != 0"
          ></el-button>
        </div>
      </el-form>
      <div slot="footer" class="dialog-footer">
        <el-button type="primary" @click="submitForm">确 定</el-button>
        <el-button @click="cancel">取 消</el-button>
      </div>
    </el-dialog>
    <!-- 修改护理站部门信息对话框 -->
    <el-dialog :title="title" :visible.sync="open" width="500px" append-to-body>
      <el-form ref="form" :model="form" :rules="rules" label-width="100px">
        <el-form-item label="所属护理站" prop="nurseStationId">
          <el-input
            v-model="form.nurseStationName"
            placeholder="请选择所属护理站"
            style="width: 250px"
            disabled
          />
        </el-form-item>
        <el-form-item label="科室名称" prop="departmentName">
          <el-input
            v-model="form.departmentName"
            placeholder="请输入科室名称"
            style="width: 250px"
            maxlength="15"
          />
        </el-form-item>
        <el-form-item label="科室负责人" prop="departmentPerson">
          <el-input
            v-model="form.departmentPerson"
            placeholder="请输入科室负责人"
            style="width: 250px"
          />
        </el-form-item>
        <el-form-item label="联系电话" prop="phone">
          <el-input
            v-model="form.phone"
            placeholder="请输入联系电话"
            maxlength="11"
            style="width: 250px"
          />
        </el-form-item>
      </el-form>
      <div slot="footer" class="dialog-footer">
        <el-button type="primary" @click="submitForm">确 定</el-button>
        <el-button @click="cancel">取 消</el-button>
      </div>
    </el-dialog>
    <!-- 新增护理站名称弹框 -->
    <el-dialog
      title="选择护理站"
      :visible.sync="innerVisible"
      width="1000px"
      append-to-body
      :before-close="innerVisiblecancel"
    >
      <el-form
        ref="queryForm"
        :model="nurseStationqueryParams"
        :rules="rules"
        label-width="80px"
        :inline="true"
      >
        <el-form-item
          label="护理站编码"
          prop="nurseStationCode"
          label-width="120"
        >
          <el-input
            v-model="nurseStationqueryParams.nurseStationCode"
            placeholder="请输入护理站编码"
            clearable
            @keyup.enter.native="addhd"
          />
        </el-form-item>
        <el-form-item
          label="护理站名称"
          prop="nurseStationName"
          label-width="120"
        >
          <el-input
            v-model="nurseStationqueryParams.nurseStationName"
            placeholder="请输入护理站名称"
            clearable
            @keyup.enter.native="addhd"
          />
        </el-form-item>
        <el-form-item>
          <el-button
            type="primary"
            icon="el-icon-search"
            size="mini"
            @click="addhd"
            >搜索</el-button
          >
          <el-button icon="el-icon-refresh" size="mini" @click="addresetQuery"
            >重置</el-button
          >
        </el-form-item>
      </el-form>
      <el-table
        :data="nurseStationlist"
        @cell-dblclick="nurseclick"
        v-loading="loading"
      >
        <el-table-column label="请选择" width="100" align="center">
          <template slot-scope="scope">
            <el-button
              type="primary"
              style="width: 15px; height: 15px"
              v-if="stationid == scope.row.id"
              circle
              @click="nurseclick(scope.row)"
            ></el-button>
            <el-button
              v-else
              style="width: 15px; height: 15px"
              circle
              @click="nurseclick(scope.row)"
            ></el-button>
          </template>
        </el-table-column>
        <el-table-column
          property="nurseStationCode"
          label="护理站编码"
          align="center"
        >
        </el-table-column>
        <el-table-column
          property="nurseStationName"
          label="护理站名称"
          align="center"
          :show-overflow-tooltip="true"
        >
        </el-table-column>
        <el-table-column property="phone" label="联系电话" align="center">
        </el-table-column>
        <el-table-column
          property="address"
          label="护理站地址"
          align="center"
          :show-overflow-tooltip="true"
        >
        </el-table-column>
      </el-table>
      <pagination
        v-show="total2 > 0"
        :total="total2"
        :page.sync="nurseStationqueryParams.pageNum"
        :limit.sync="nurseStationqueryParams.pageSize"
        @pagination="info"
      />
    </el-dialog>
  </div>
</template>
<script>
import {
  listStationDepartment,
  getStationDepartment,
  delStationDepartment,
  addStationDepartment,
  updateStationDepartment,
} from "@/api/system/StationDepartment";
import { getListByUser } from "@/api/system/userlist.js";

export default {
  name: "StationDepartment",
  data() {
    // 验证手机号的规则
    var checkMobile = (rule, value, cb) => {
      // 验证手机号的正则表达式
      const regMobile =
        /^(0|86|17951)?(13[0-9]|15[012356789]|17[678]|18[0-9]|14[57]|19[0-9])[0-9]{8}$/;
      if (regMobile.test(value)) {
        return cb();
      }
      cb(new Error("请输入正确的联系电话"));
    };
    return {
      nurseStationlist: [],
      handstationlist: [],
      // 遮罩层
      loading: true,
      // 选中数组
      ids: [],
      // 非单个禁用
      single: true,
      // 非多个禁用
      multiple: true,
      // 显示搜索条件
      showSearch: true,
      // 总条数
      total: 0,
      total2: 0,
      // 护理站部门信息表格数据
      StationDepartmentList: [],
      // 弹出层标题
      title: "",
      // 是否显示弹出层
      open: false,
      addopen: false,
      // 查询参数
      queryParams: {
        pageNum: 1,
        pageSize: 10,
        nurseStationId: null,
        departmentCode: null,
        departmentName: null,
        departmentPerson: null,
        phone: null,
        nurseStationName: null,
      },
      nurseStationqueryParams: {
        pageNum: 1,
        pageSize: 10,
      },
      // 表单参数
      form: {},
      // 表单校验
      rules: {
        nurseStationDepartmentList: {
          nurseStationId: [
            {
              required: true,
              message: "请选择所属护理站",
              trigger: "blur",
            },
          ],
          departmentName: [
            {
              required: true,
              message: "请选择科室名称",
              trigger: "blur",
            },
          ],
          departmentPerson: [
            {
              required: true,
              message: "请选择科室负责人",
              trigger: "blur",
            },
          ],
          phone: [
            {
              required: true,
              validator: checkMobile,
              trigger: "blur",
              message: "",
            },
          ],
        },
        nurseStationId: [
          {
            required: true,
            message: "请选择所属护理站",
            trigger: "blur",
          },
        ],
        departmentName: [
          {
            required: true,
            message: "请选择科室名称",
            trigger: "blur",
          },
        ],
        departmentPerson: [
          {
            required: true,
            message: "请选择科室负责人",
            trigger: "blur",
          },
        ],
        phone: [
          {
            required: true,
            validator: checkMobile,
            trigger: "blur",
            message: "",
          },
        ],
      },
      index: "",
      stationid: "",
      innerVisible: false,
    };
  },
  created() {
    this.info();
    this.infos();
  },
  methods: {
    // add点击护理站名称
    nurseclick(row) {
      this.stationid = row.id;
      this.innerVisible = false;
      this.form.nurseStationDepartmentList[this.index].nurseStationName =
        row.nurseStationName;
      this.form.nurseStationDepartmentList[this.index].nurseStationId = row.id;
    },
    // 新增护理站按钮
    clickinnerVisible(item, index) {
      this.stationid = item.nurseStationId;
      this.innerVisible = true;
      this.index = index;
    },
    //删除deldisease
    deldisease(index) {
      this.form.nurseStationDepartmentList.splice(index, 1);
    },
    adddisease() {
      var obj = {
        nurseStationId: "",
        departmentCode: "",
        departmentName: "",
        departmentPerson: "",
        phone: "",
        nurseStationName: "请选择所属护理站",
      };
      if (this.form.nurseStationDepartmentList.length == 5) {
        this.$message.error("最多只能5条");
      } else {
        this.form.nurseStationDepartmentList.push(obj);
      }
    },
    //添加
    getList() {
      this.loading = true;
      listStationDepartment(this.queryParams).then((response) => {
        this.nurseStationDepartmentList = response.rows;
        this.total = response.total;
        this.loading = false;
      });
    },
    /** 查询护理站部门信息列表 */
    getList() {
      this.loading = true;
      listStationDepartment(this.queryParams).then((response) => {
        this.StationDepartmentList = response.rows;
        this.total = response.total;
        this.loading = false;
      });
    },
    // 取消按钮
    cancel() {
      this.open = false;
      this.addopen = false;
      this.reset();
    },
    // 表单重置
    reset() {
      this.form = {
        id: null,
        pageNum: 1,
        pageSize: 10,
        departmentCode: null,
        departmentName: null,
        departmentPerson: null,
        phone: null,
        createBy: null,
        createTime: null,
        updateBy: null,
        updateTime: null,
  
        nurseStationDepartmentList: [
          {
            nurseStationId: "",
            departmentCode: "",
            departmentName: "",
            departmentPerson: "",
            phone: "",
            nurseStationName: "请选择所属护理站",
          },
        ],
      };
      this.resetForm("form");
    },
    /** 搜索按钮操作 */
    handleQuery() {
      this.queryParams.pageNum = 1;
      this.getList();
    },
    innerVisiblecancel() {
      this.innerVisible = false;
      this.addresetQuery();
    },
    /** 重置按钮操作 */
    resetQuery() {
    
        // this.queryParams = {
        //   pageNum: 1,
        //   pageSize: 10,
     
        //   departmentCode: null,
        //   departmentName: null,
        //   departmentPerson: null,
        //   phone: null,
        //   nurseStationName: null,
        // };
        if (this.nurseStationlist[0]) {
        this.queryParams.pageNum = 1;
        this.queryParams.pageSize = 10;
        this.queryParams.departmentCode = null;
        this.queryParams.departmentName = null;
      }
        this.handleQuery();
      },
    
    addhd() {
      this.loading = true;
      getListByUser(this.nurseStationqueryParams).then((res) => {
        this.total2 = res.total;
        this.nurseStationlist = res.rows;
      });
      this.loading = false;
    },
    addresetQuery() {
      this.nurseStationqueryParams = {
        pageNum: 1,
        pageSize: 10,
      };
      this.addhd();
    },
    //权限列表
    info() {
      getListByUser(this.nurseStationqueryParams).then((res) => {
          this.total2 = res.total;
          this.nurseStationlist = res.rows;
          this.queryParams.nurseStationId = res.rows[0].id;
          this.getList();
      });
    },
    // 多选框选中数据
    handleSelectionChange(selection) {
      this.ids = selection.map((item) => item.id);
      this.single = selection.length !== 1;
      this.multiple = !selection.length;
    },
    /** 新增按钮操作 */
    handleAdd() {
      this.reset();
      this.addopen = true;
      // this.nurseStationName="",
      this.title = "添加护理站部门信息";
    },
    /** 修改按钮操作 */
    handleUpdate(row) {
      this.reset();
      const id = row.id || this.ids;
      getStationDepartment(id).then((response) => {
        this.form = response.data;
        this.open = true;
        this.title = "修改护理站部门信息";
      });
    },
    /** 提交按钮 */
    submitForm() {
      this.$refs["form"].validate((valid) => {
        if (valid) {
          if (this.form.id != null) {
            updateStationDepartment(this.form).then((response) => {
              this.$modal.msgSuccess("修改成功");
              this.open = false;
              this.getList();
            });
          } else {
            addStationDepartment(this.form).then((response) => {
              this.$modal.msgSuccess("新增成功");
              this.addopen = false;
              this.getList();
            });
          }
        }
      });
    },
    /** 删除按钮操作 */
    handleDelete(row) {
      const ids = row.id || this.ids;
      this.$modal
        .confirm("是否确认删除护理站部门信息的数据项？")
        .then(function () {
          return delStationDepartment(ids);
        })
        .then(() => {
          this.getList();
          this.$modal.msgSuccess("删除成功");
        })
        .catch(() => {});
    },
    infos() {
      var queryFor = {
        pageNum: 1,
        pageSize: 9999,
      };
      getListByUser(queryFor).then((res) => {
        this.handstationlist = res.rows;
      });
    },
    /** 导出按钮操作 */
    handleExport() {
      this.download(
        "system/StationDepartment/export",
        {
          ...this.queryParams,
        },
        `StationDepartment_${new Date().getTime()}.xlsx`
      );
    },
  },
};
</script>
